RETURN:  When this key is pressed, the characters on the current line are
submitted to DOS for processing.  Pressing this key informs DOS that the
characters you have typed on the current line represent the command you want
to have processed, and that you are ready for the processing to begin.

On most keyboards the RETURN key has this symbol:  ÄÄÙ
